0 500 1000 1500 2000 2500 0

2000

4000

6000

8000

10000

12000

14000

16000

Reaction time(s)

Multiplication factor

35 ^0C - 45 s 40 ^0C - 45 s 40 ^0C - 120 s

Thershold limit